Copyright: Allen M. Servedio 2/27/1996  v1.0


index
Rising Tool Bar Help File

Rising Tool Bar

Required Procedure

InitRiseTool - Execute this procedure for each rising tool bar in the constructor of your form.

Custom Changes

amsAutoHide - If the panel will auto-hide or not (i.e. will it shrink when a hot side is hit).

amsAmountShown - The amount of the panel showing when shrunk.

amsHotBandWidth - The width of the "hot" sides (panel will shrink when the mouse moves into this area).

amsSpaceBetweenCtrl - The space between controls on the panel.

Procedures That You Can Override

InitRiseTool (No Parameters) - This is the procedure that you call to initialize the position all of the controls within the panel.

ArrangeControls (No Parameters) - The procedure that moves the controls into position within the panel.